= New website
Jean-Philippe Orsini <jeanfi@gmail.com>
:docinfo2:
:date: 2016-14-06
:icons: font

After being bored with Wordpress for years, the link:http://wpitchoune.net[wpitchoune.net]
website is changing. It is now based on link:http://asciidoctor.org[Asciidoctor] and
a simple shell script to generate it.

With the help of link:http://atom.io[Atom] and a couple of addons dedicated to
Asciidoctor, it is easy and quick to write content. I am happy to no
more have to worry about the painful admistration of Wordpress,
upgrading it, taking care of security, spamming of comments and bot
account creation, and backup of databases.

If you want to know how the website is built, everything is on
a GIT repository: http://git.wpitchoune.net/gitweb/?p=www.git.
It is simple, really simple... but enough for my needs.
